SunOS 5.5 Realtime Library fdatasync (3R)

NAME fdatasync − synchronize a file’s data

SYNOPSIS cc [ flag ... ] file ... − lposix4 [ library ... ]

#include <unistd.h> int fdatasync(int fildes);

MT-LEVEL Async-Signal-Safe

DESCRIPTION fdatasync( ) forces all currently queued I/O operations associated with the file descriptor fildes to synchronized I/O data integrity completion. See fcntl (5) definition of

O_DSYNC .

RETURN VALUES fdatasync( ) returns 0 upon success; otherwise, it returns -1 and sets errno to indicate the error condition.

ERRORS EBADF fildes is not a valid file descriptor.

EINVAL This implementation does not support synchronized I/O for this file.

ENOSYS fdatasync( ) is not supported by this implementation.

In the event that any of the queued I/O operations fail, fdatasync( ) returns the error conditions defined for read(2) and write (2).

SEE ALSO fcntl (2), open (2), read(2), write (2), fsync (3C), aio_fsync (3R), fcntl (5)

NOTES If fdatasync( ) fails, outstanding I/O operations are not guaranteed to have been completed.

modified 19 Aug 1993 3R-379