kstat_open (3K) Kernel VM Library Functions SunOS 5.5

NAME kstat_open, kstat_close − initialize kernel statistics facility

SYNOPSIS cc [ flag ... ] file... -lkstat [ library. .. ]

#include <kstat.h> kstat_ctl_t ∗kstat_open(void);

int kstat_close(kstat_ctl_t ∗kc);

DESCRIPTION kstat_open( ) initializes a kstat control structure, which provides access to the kernel statistics library. It returns a pointer to this structure, which must be supplied as the kc argument in subsequent libkstat function calls.

kstat_close( ) frees all resources that were associated with kc. This is done automatically on exit(2) and execve( ) (see exec(2)).

RETURN VALUES kstat_open( ) returns a pointer to a kstat control structure. On failure, it returns NULL and no resources are allocated.

kstat_close( ) returns 0 on success, − 1 on failure.

FILES /dev/kstat kernel statistics driver

SEE ALSO kstat (3K), kstat_chain_update (3K), kstat_data_lookup (3K), kstat_lookup (3K), kstat_read (3K), kstat_write (3K)

3K-620 modified 26 May 1994