getdtablesize (3C ) C Library Functions SunOS 5.5

NAME getdtablesize − get file descriptor table size

SYNOPSIS #include <unistd.h> int getdtablesize(void);

DESCRIPTION Each process has a file descriptor table which is guaranteed to have at least 20 slots. The entries in the descriptor table are numbered with small integers starting at 0. The getdtablesize( ) function returns the current maximum size of this table by calling the getrlimit( ) function.

SEE ALSO close (2), getrlimit (2), open (2), pipe (2), select (3C) sysconf (3C)

3C-486 modified 18 Feb 1993