SunOS 5.5 C Library Functions gethostid (3C )

NAME gethostid − get unique identifier of current host

SYNOPSIS #include <unistd.h> long gethostid(void);

DESCRIPTION gethostid( ) returns the 32-bit identifier for the current host, which should be unique across all hosts. This number is usually taken from the CPU board’s ID PROM.

SEE ALSO hostid (1), sysinfo (2) modified 12 Feb 1993 3C-497