SunOS 5.5 C Library Functions getpagesize (3C )

NAME getpagesize − get system page size

SYNOPSIS #include <unistd.h> int getpagesize(void);

DESCRIPTION getpagesize( ) returns the number of bytes in a page. Page granularity is the granularity of many of the memory management calls.

The page size is a system page size and need not be the same as the underlying hardware page size.

SEE ALSO pagesize (1), brk (2), mmap (2), sysconf (3C) modified 12 Feb 1993 3C-515