SunOS 5.5 C Library Functions killpg (3C )

NAME killpg − send signal to a process group

SYNOPSIS #include <signal.h> int killpg(pid_t pgrp, int sig);

DESCRIPTION killpg( ) sends the signal sig to the process group pgrp. See signal (5) for a list of signals.

The real or effective user ID of the sending process must match the real or saved set-user

ID of the receiving process, unless the effective user ID of the sending process is the privileged user. A single exception is the signal SIGCONT, which may always be sent to any descendant of the current process.

RETURN VALUES Upon successful completion, a value of 0 is returned. Otherwise, a value of − 1 is returned and the global variable errno is set to indicate the error.

ERRORS killpg( ) will fail and no signal will be sent if any of the following occur:

EINVAL sig is not a valid signal number.

EPERM The effective user ID of the sending process is not privileged user, and neither its real nor effective user ID matches the real or saved set-user ID of one or more of the target processes.

ESRCH No processes were found in the specified process group.

SEE ALSO kill (2), setpgrp (2), sigaction (2), signal (5) modified 12 Feb 1993 3C-605