thr_main (3T) Threads Library SunOS 5.5

NAME thr_main − identify the main thread

SYNOPSIS cc [ flag ... ] file ... − lthread [ library ... ]

#include <thread.h> int thr_main(void)

MT-LEVEL MT-Safe

DESCRIPTION thr_main( ) returns:

• 1 if the calling thread is the main thread.

• 0 if the calling thread is not the main thread.

• -1 if libthread is not linked in or thread initialization has not completed.

FILES /lib/libthread

SEE ALSO thr_self (3T)

3T-1142 modified 22 Nov 1994