ualarm (3C ) C Library Functions SunOS 5.5

NAME ualarm − schedule signal after interval in microseconds

SYNOPSIS #include <unistd.h> unsigned int ualarm(unsigned int usecs, unsigned int interval);

DESCRIPTION ualarm( ) sends signal SIGALRM (see signal (3C)), to the caller in a number of microseconds given by the usecsargument. Unless caught or ignored, the signal terminates the caller.

If the interval argument is non-zero, the SIGALRM signal will be sent to the caller every interval microseconds after the timer expires (for instance, after usecsmicroseconds have passed).

Because of scheduling delays, resumption of execution when the signal is caught may be delayed an arbitrary amount.

Interactions between ualarm () and either alarm (2) or sleep (3C) are unspecified.

RETURN VALUES The return value is the amount of time previously remaining in the alarm clock.

SEE ALSO alarm (2), getitimer (2), setitimer (2), sighold (3C), signal (3C), sleep (3C), usleep (3C)

NOTES ualarm( ) is a simplified interface to setitimer (2); (see getitimer (2)).

3C-1172 modified 12 Feb 1993