SunOS 5.5 Miscellaneous Library Functions volmgt_root (3X)

NAME volmgt_root − return the Volume Management root directory

SYNOPSIS cc [ flag ... ] file ... − lvolmgt [ library. ... ]

#include <volmgt.h> char ∗volmgt_root(void);

MT-LEVEL MT-Safe

DESCRIPTION volmgt_root( ) returns the current Volume Management root directory, which by default is /vol but can be configured to be in a different location.

RETURN VALUES A pointer to a static string containing the root directory for Volume Management is returned.

ERRORS This routine may fail if an open( ) of /dev/volctl fails. If this occurs a pointer to the default Volume Management root directory is returned.

EXAMPLES To find out where the Volume Management root directory is:

if ((path = volmgt_root()) != NULL) {

(void) printf("Volume Management root dir=%s\n", path);

}else {

(void) printf("can’t find Volume Management root dir\n"); } FILES /vol Default location for the Volume Management root directory

SEE ALSO cc(1B), vold (1M), open (2), volmgt_check (3X),volmgt_inuse (3X),volmgt_running (3X), volfs (7FS)

NOTES This routine will return the default root directory location even when Volume Management is not running.

modified 30 May 1995 3X-1181