volmgt_running (3X) Miscellaneous Library Functions SunOS 5.5

NAME volmgt_running − return whether or not Volume Management is running

SYNOPSIS cc [ flag ... ] file ... − lvolmgt [ library. ... ]

#include <volmgt.h> int volmgt_running(void);

MT-LEVEL MT-Safe

DESCRIPTION volmgt_running( ) tells whether or not Volume Management is running.

RETURN VALUES A non-zero value is returned if Volume Management is running, else 0 is returned.

ERRORS volmgt_running( ) will fail, returning 0, if a stat (2) or open (2) of /dev/volctl fails, or if any of the following is true:

ENXIO Volume Management is not running.

EINTR An interrupt signal was detected while checking to see if Volume

Management was running.

EXAMPLES To see if Volume Management is running:

if (volmgt_running() != 0) {

(void) printf("Volume Management is running\n");

}else {

(void) printf("Volume Management is NOT running\n"); } SEE ALSO cc(1B), vold (1M), open (2), stat (2), volmgt_check (3X),volmgt_inuse (3X),volfs (7FS)

NOTES Volume Management must be running for many of the Volume Management library routines to work.

3X-1182 modified 30 May 1995