SunOS 5.5 Kernel Functions for Drivers nochpoll (9F)

NAME nochpoll − error return function for non-pollable devices

SYNOPSIS #include <sys/ddi.h>

#include <sys/sunddi.h> int nochpoll(dev_t dev, short events, int anyyet, short ∗reventsp, struct pollhead ∗∗pollhdrp);

INTERFACE

LEVEL Solaris DDI specific (Solaris DDI).

ARGUMENTS dev Device number.

events Event flags.

anyyet Check current events only.

reventsp Event flag pointer.

pollhdrp Poll head pointer.

DESCRIPTION nochpoll () is a routine that simply returns the value ENXIO. It is intended to be used in the cb_ops (9S) structure of a device driver for devices that do not support the poll (2) system call.

RETURN VALUE nochpoll () returns ENXIO.

CONTEXT nochpoll () can be called from user or interrupt context.

SEE ALSO poll (2), cb_ops (9S)

WritingDevice Drivers modified 11 Apr 1991 9F-277