bioerror (9F) Kernel Functions for Drivers SunOS 5.5

NAME bioerror − indicate error in buffer header

SYNOPSIS #include <sys/types.h>

#include <sys/buf.h>

#include <sys/ddi.h> void bioerror(struct buf ∗bp, int error);

INTERFACE

LEVEL Solaris DDI specific (Solaris DDI)

ARGUMENTS bp Pointer to the buf (9S) structure describing the transfer.

error Error number to be set, or zero to clear an error indication.

DESCRIPTION If error is non-zero, bioerror( ) indicates an error has occured in the buf (9S) structure. A subsequent call to geterror (9F) will return error.

If error is 0, the error indication is cleared and a subsequent call to geterror (9F) will return 0. CONTEXT bioerror( ) can be called from any context.

SEE ALSO strategy (9E), geterror (9F), getrbuf (9F), buf (9S)

9F-48 modified 26 May 1994