SunOS 5.5 Kernel Functions for Drivers bioreset (9F)

NAME bioreset − reuse a private buffer header after I/O is complete

SYNOPSIS #include <sys/buf.h>

#include <sys/ddi.h> void bioreset(struct buf ∗bp);

INTERFACE

LEVEL Solaris DDI specific (Solaris DDI)

ARGUMENTS bp Pointer to the buf (9S) structure.

DESCRIPTION bioreset( ) is used by drivers that allocate private buffers with getrbuf (9F) and want to reuse them in multiple transfers before freeing them with freerbuf (9F). bioreset( ) resets the buffer header to the state it had when initially allocated.

CONTEXT bioreset( ) can be called from any context.

SEE ALSO strategy (9E), freerbuf (9F), getrbuf (9F), buf (9S)

NOTES bp must not describe a transfer in progress.

modified 26 May 1994 9F-49