Solaris XWindow System 3.5 User Commands oclock (1)

NAME oclock − display time of day

SYNOPSIS oclock [ -options... ]

DESCRIPTION Oclock simply displays the current time on an analog display

OPTIONS -fg foreground color choose a different color for the both hands and the jewel of the clock

-bg background color choose a different color for the background.

-jewel jewelcolor choose a different color for the jewel on the clock.

-minute minute color choose a different color for the minute hand of the clock.

-hour hour color choose a different color for the hour hand of the clock.

-backing WhenMapped | Always | NotUseful selects an appropriate level of backing store.

-geometry geometry define the initial window geometry; see X11(7).

-display display specify the display to use; see X11(7).

-bd border color choose a different color for the window border.

-bw border width choose a different width for the window border. As the Clock widget changes its border around quite a bit, this is most usefully set to zero.

-noshape causes the clock to not reshape itself and ancestors to exactly fit the outline of the clock.

-transparent causes the clock to consist only of the jewel, the hands, and the border.

COLORS If you would like your clock to be viewable in color, include the following in the #ifdef

COLOR section you read with xrdb:

∗customization: -color

This will cause oclock to pick up the colors in the app-defaults color customization file:

/usr/openwin/lib/app-defaults/Clock-color . Below are the default colors:

Clock∗Background: grey oclock (1) User Commands Solaris XWindow System 3.5

Clock∗BorderColor: light blue

Clock∗hour: yellow

Clock∗jewel: yellow

Clock∗minute: yellow

SEE ALSO X11(7), XToolkit documentation

COPYRIGHT Copyright 1989, Massachusetts Institute of Technology.

See X11(7) for a full statement of rights and permissions.

AUTHOR Keith Packard, MIT XConsortium