Solaris XWindow System 3.5 User Commands xlsatoms (1)

NAME xlsatoms − list interned atoms defined on server

SYNOPSIS xlsatoms [-options ...]

DESCRIPTION Xlsatoms lists the interned atoms. By default, all atoms starting from 1 (the lowest atom value defined by the protocol) are listed until unknown atom is found. If an explicit range is given, xlsatoms will try all atoms in the range, regardless of whether or not any are undefined.

OPTIONS − display dpy

This option specifies the Xserver to which to connect.

− format string

This option specifies a printf-style string used to list each atom <value,name> pair, printed in that order (value is an unsigned long and name is a char ∗). Xlsatoms will supply a newline at the end of each line. The default is %ld\t%s.

− range [low]-[high]

This option specifies the range of atom values to check. If lowis not given, a value of 1 assumed. If high is not given, xlsatomswill stop at the first undefined atom at or above low.

− name string

This option specifies the name of an atom to list. If the atom does not exist, a message will be printed on the standard error.

SEE ALSO X11(7), Xserver (1), xprop (1)

ENVIRONMENT DISPLAY to get the default host and display to use.

COPYRIGHT Copyright 1989, Massachusetts Institute of Technology.

See X11(7)for a full statement of rights and permissions.

AUTHOR Jim Fulton, MIT XConsortium modified 18 March 1994 1