Solaris XWindow System 3.5 User Commands xmag (1)

NAME xmag − magnify parts of the screen

SYNOPSIS xmag [ − mag magfactor ] [ − source geom] [ − toolkitoption ... ]

DESCRIPTION The xmag program allows you to magnify portions of an Xscreen. If no explicit region is specified, a square with the pointer in the upper left corner is displayed indicating the area to be enlarged. The area can be dragged out to the desired size by pressing Button 2.

Once a region has been selected, a window is popped up showing a blown up version of the region in which each pixel in the source image is represented by a small square of the same color. Pressing Button1 in the enlargement window shows the position and RGB value of the pixel under the pointer until the button is released. Typing ‘‘Q’’or ‘‘^C’’in the enlargement window exits the program. The application has 5 buttons across its top.

Close deletes this particular magnification instance. Replace brings up the rubber band selector again to select another region for this magnification instance. Newbrings up the rubber band selector to create a new magnification instance. Cut puts the magnification image into the primary selection. Paste copies the primary selection buffer into xmag.

Note that you can cut and paste between xmag and the bitmap (1) program. Resizing xmag resizes the magnification area. xmag preserves the colormap, visual, and window depth of the source.

WIDGETS xmag uses the XToolkit and the Athena Widget Set. The magnified image is displayed in the Scale widget. For more information, see the Athena Widget Set documentation.

Below is the widget structure of the xmag application. Indentation indicates hierarchical structure. The widget class name is given first, followed by the widget instance name.

Xmag xmag

RootWindow root

TopLevelShell xmag

Paned pane1

Paned pane2

Command close

Command replace

Command new

Command select

Command paste

Label xmag label

Paned pane2

Scale scale

OverrideShell pixShell

Label pixLabel

OPTIONS − source geom This option specifies the size and/or location of the source region on the screen. By default, a 64x64 square is provided for the user to select an area of the screen.

xmag (1) User Commands Solaris XWindow System 3.5

− mag integer This option indicates the magnification to be used. 5 is the default.

COPYRIGHT Copyright 1991, Massachusetts Institute of Technology.

See X11(7),for a full statement of rights and permissions.

SEE ALSO X11(7), xmag_multivis (6)

AUTHORS Dave Sternlicht and Davor Matic, MIT XConsortium.