SunOS 5.5 Maintenance Commands Uutry (1M )

NAME Uutry, uutry − try to contact remote system with debugging on

SYNOPSIS /usr/lib/uucp/Uutry [ − r ] [ − ctype ] [ − xdebug-level] system-name

DESCRIPTION Uutry is a shell script that is used to invoke uucico (1M) to call a remote site. Debugging is initially turned on and is set to the default value of 5. The debugging output is put in file /tmp/ system-name.

OPTIONS − r This option overrides the retry time that is set in file

/var/uucp/.Status/ system-name.

− ctype The first field in the Devices file is the "Type" field. The − c option forces uucico to only use entries in the "Type" field that match the user specified type. The specified type is usually the name of a local area network.

− xdebug-level debug-levelis a number from 0 to 9. Higher numbers give more detailed debugging information.

FILES /etc/uucp/Devices

/etc/uucp/Limits

/etc/uucp/Permissions

/etc/uucp/Systems

/tmp/ system-name

/var/spool/locks/ ∗

/var/spool/uucp/ ∗

/var/spool/uucppublic/ ∗

SEE ALSO uucp (1C), uux (1C), uucico (1M) modified 18 May 1993 1M-19