killall (1M ) Maintenance Commands SunOS 5.5

NAME killall − kill all active processes

SYNOPSIS /usr/sbin/killall [ signal ]

AVAILABILITY SUNWcsu

DESCRIPTION killall is used by shutdown (1M) to kill all active processes not directly related to the shutdown procedure.

killall terminates all processes with open files so that the mounted file systems will be unbusied and can be unmounted.

killall sends signal (see kill (1)) to the active processes. If no signal is specified, a default of 15 is used.

The killall command can be run only by the super-user.

SEE ALSO kill (1), ps(1), fuser (1M), shutdown (1M), signal (3C)

1M-314 modified 14 Sep 1992