SunOS 5.5 Maintenance Commands nisshowcache (1M )

NAME nisshowcache − NIS+ utility to print out the contents of the shared cache file

SYNOPSIS /usr/lib/nis/nisshowcache [ − v ]

DESCRIPTION nisshowcache prints out the contents of the per-machine NIS+ directory cache that is shared by all processes accessing NIS+ on the machine. By default, nisshowcache only prints out the directory names in the cache along with the cache header. The shared cache is maintained by nis_cachemgr (1M).

OPTIONS − v Verbose mode. Print out the contents of each directory object, including information on the server name and its universal addresses.

FILES /var/nis/NIS_SHARED_DIRCACHE

SEE ALSO nis_cachemgr (1M), syslogd(1M), nisfiles (4)

DIAGNOSTICS Error messages are sent to the syslogd(1M) daemon.

modified 26 Sep 1992 1M-447