SunOS 5.5 Maintenance Commands rpc.rwalld (1M )

NAME rpc.rwalld, rwalld − network rwall server

SYNOPSIS /usr/lib/netsvc/rwall/rpc.rwalld

DESCRIPTION rpc.rwalld is a server that handles rwall (1M) requests. It is implemented by calling wall (1M) on all the appropriate network machines. The rpc.rwalld daemon may be started by inetd (1M) or listen (1M).

SEE ALSO inetd (1M), listen (1M), rwall (1M), wall (1M) modified 5 Jul 1990 1M-535