SunOS 5.5 Maintenance Commands rpc.rstatd (1M )

NAME rpc.rstatd, rstatd − kernel statistics server

SYNOPSIS /usr/lib/netsvc/rstat/rpc.rstatd

DESCRIPTION rpc.rstatd is a server which returns performance statistics obtained from the kernel.

rup (1) uses rpc.rstatd to collect the uptime information that it displays.

rpc.rstatd is an RPC service.

SEE ALSO rup (1), inetd (1M), services (4) modified 1 Oct 1991 1M-533