SunOS 5.5 Maintenance Commands sysidtool (1M )

NAME sysidtool, sysidnet, sysidnis, sysidsys, sysidroot − system configuration

SYNOPSIS /usr/sbin/sysidnet

/usr/sbin/sysidnis

/usr/sbin/sysidsys

/usr/sbin/sysidroot

AVAILABILITY SUNWadmap

DESCRIPTION sysidtool is a suite of four programs that configure a new system, or one that has been unconfigured with sys-unconfig (1M). The sysidtool programs run automatically at system installation, or during the first boot after a machine has been successfully unconfigured.

These programs have no effect except at such times, and should never be run manually.

The sysidtool programs set up the appropriate information in the machine’s configuration files, in the kernel, and on the machine’s network interface. They may prompt for the following information:

sysidnet : network configuration

• Machine’s default locale

• Machine’s console type

• Machine’s host name

• Machine’s IP address sysidnis : NIS/NIS+ client configuration

• Name service choice: NIS+, NIS, or none

• Machine’s IP subnet mask (if no NIS/NIS+ server can automatically be located on the machine’s sub-network)

• NIS/NIS+ domain name

• Hostname and IP address of an NIS/NIS+ server in the domain sysidsys : miscellaneous system configuration

• Machine’s IP subnet mask (if an NIS/NIS+ server was automatically located on the machine’s sub-network)

• Machine’s time zone

• Date and time sysidroot : control superuser information

• Machine’s root password sysidconfig : host or platform-specific configuration

• This command controls specification and execution of custom configuration applications which may be specified for a particular host or a particular platform. (See sysidconfig (1M)).

The sysidtool programs attempt to obtain configuration information from various network services and databases, as set up by the Host Manager function of admintool (1M).

Only when information is missing from these services and databases, do the sysidtool programs prompt the user for the information. However, the user is always prompted modified 27 Jan 1995 1M-657 sysidtool (1M ) Maintenance Commands SunOS 5.5 for the system’s root password.

The machine’s configuration information is set up in its /etc and /var files.

FILES /etc/.UNCONFIGURED

/etc/nodename

/etc/hostname.??[0-9]

/etc/default/init

/etc/defaultdomain

/etc/passwd password file. See passwd (4).

/etc/shadow shadow password file. See shadow (4).

/etc/inet/hosts

/etc/inet/netmasks

/etc/net/ ∗/hosts

/var/nis/ NIS_COLD_START

/var/yp/aliases

/var/yp/binding/ ∗/ypservers

/etc/.sysIDtool.state

SEE ALSO admintool (1M), sysidconfig (1M), sys-unconfig (1M), passwd (4), shadow (4)

NOTES If a system has more than one network interface, you can use sysidtool to configure only the primary interface on the system. All other interfaces on the system must be configured manually.

1M-658 modified 27 Jan 1995