list_devices (1M ) Maintenance Commands SunOS 5.5

NAME list_devices − list allocatable devices

SYNOPSIS list_devices [ − s ] [ − U uid ] − l [ device] list_devices [ − s ] [ − U uid ] − n [ device] list_devices [ − s ] [ − U uid ] − u [ device]

AVAILABILITY The functionality described in this man page is available only if the Basic Security

Module (BSM) has been enabled. See bsmconv (1M) for more information.

DESCRIPTION list_devices lists the allocatable devices in the system according to specified qualifications.

The deviceand all device special files associated with the device are listed. The device argument is optional and if it is not present, all relevant devices are listed.

OPTIONS − l [device]

List the pathname(s) of the device special files associated with the device that are allocatable to the current process. If deviceis given, list only the files associated with the specified device.

− n [device]

List the pathname(s) of device special files associated with the device that are allocatable to the current process but are not currently allocated. If deviceis given, list only the files associated with that device.

− s Silent. Suppresses any diagnostic output.

− u [device]

List the pathname(s) of device special files, associated with the device that are allocated to the owner of the current process. If deviceis given, list only the files associated with that device.

− U uid Use the user ID uid instead of the real user ID of the current process when performing the list_devices operation. Only the super user can use this option.

DIAGNOSTICS list_devices returns an nonzero exit status in the event of an error.

FILES /etc/security/device_allocate

/etc/security/device_maps

/etc/security/dev/ ∗

/usr/security/lib/ ∗

SEE ALSO allocate (1M), bsmconv (1M), deallocate (1M), device_allocate (4), device_maps (4)

1M-322 modified 6 May 1993