SunOS 5.5 Maintenance Commands in.uucpd (1M )

NAME in.uucpd, uucpd − UUCP server

SYNOPSIS /usr/sbin/in.uucpd [ − n ]

AVAILABILITY SUNWbnuu

DESCRIPTION in.uucpd is the server for supporting UUCP connections over networks.

in.uucpd is invoked by inetd (1M) when a UUCP connection is established (that is, a connection to the port indicated in the “uucp” service specification; see services (4)), and executes the following protocol:

1) The server prompts with login: . The uucico (1M) process at the other end must supply a username.

2) Unless the username refers to an account without a password, the server then prompts with Password: . The uucico process at the other end must supply the password for that account.

If the username is not valid, or is valid but refers to an account that does not have

/usr/lib/uucp/uucico as its login shell, or if the password is not the correct password for that account, the connection is dropped. Otherwise, uucico is run, with the user ID, group ID, group set, and home directory for that account, with the environment variables

USER and LOGNAME set to the specified username, and with a − u flag specifying the username. Unless the − n flag is specified, entries are made in /var/adm/utmp,

/var/adm/wtmp, and /var/adm/lastlog for the username. in.uucpd must be invoked by a user with appropriate privilege (usually root) in order to be able to verify that the password is correct.

FILES /var/adm/utmp accounting

/var/adm/wtmp accounting

/var/adm/lastlog time of last login

SEE ALSO inetd (1M), uucico (1M), services (4)

DIAGNOSTICS All diagnostic messages are returned on the connection, after which the connection is closed.

user read

An error occurred while reading the username.

passwd read

An error occurred while reading the password.

Login incorrect.

The username is invalid or refers to an account with a login shell other than

/usr/lib/uucp/uucico , or the password is not the correct password for the account.

modified 14 Sep 1992 1M-283