SunOS 5.5 Maintenance Commands cachefswssize (1M )

NAME cachefswssize − Determine working set size for cachefs

SYNOPSIS cachefswssize logfile

AVAILABILITY SUNWcsu

DESCRIPTION The cachefswssize command displays the workspace size determined from logfile. This includes the amount of cache space needed for each filesystem that was mounted under the cache, as well as a total.

EXAMPLES example% cachefswssize /var/tmp/samlog

/home/sam end size: 10688k high water size: 10704k

/foo end size: 128k high water size: 128k

/usr/dist end size: 1472k high water size: 1472k total for cache initial size: 110960k end size: 12288k high water size: 12304k

EXIT STATUS The following exit values are returned:

0 success non-zero an error has occurred.

SEE ALSO cachefslog (1M)

DIAGNOSTICS problems were encountered writing log file

There were problems encountered when the kernel was writing the logfile.

The most common problem is running out of disk space.

invalid log file

The logfile isn’t a valid logfile or was created with a newer version of Solaris than the one where cachefswssize is running.

modified 8 Nov 1994 1M-99