_lwp_kill (2) System Calls SunOS 5.5

NAME _lwp_kill − send a signal to a LWP

SYNOPSIS #include <sys/lwp.h>

#include <signal.h> int _lwp_kill(lwpid_t target_lwp, int sig);

DESCRIPTION _lwp_kill( ) sends a signal to the LWP specified by target_lwp. The signal that is to be sent is specified by sig and must be one from the list given in signal (5). If sig is 0 (the null signal), error checking is performed but no signal is actually sent. This can be used to check the validity of target_lwp.

The target_lwp must be an LWP within the same process as the calling LWP.

RETURN VALUES Zero is returned when successful. A non-zero value indicates an error.

ERRORS If any of the following conditions occur, _lwp_kill( ) fails and returns the corresponding value:

EINVAL sig is not a valid signal number.

ESRCH target_lwp cannot be found in the current process.

SEE ALSO kill (2), sigaction (2), sigprocmask (2), signal (5)

2-36 modified 30 Jul 1992