SunOS 5.5 System Calls _lwp_setprivate (2)

NAME _lwp_setprivate, _lwp_getprivate − set/get LWP specific storage

SYNOPSIS #include <sys/lwp.h> void _lwp_setprivate(void ∗buffer);

void ∗_lwp_getprivate(void);

DESCRIPTION The function _lwp_setprivate( ) stores the value specified by bufferin LWP-private memory that is unique to the calling LWP. This is typically used by thread library implementations to maintain a pointer to information about the thread currently running on the calling LWP.

The function _lwp_getprivate( ) returns the value stored in LWP-private memory.

SEE ALSO _lwp_makecontext (2) modified 30 Jul 1992 2-41