SunOS 5.5 Threads Library pthread_self (3T)

NAME pthread_self, thr_self − get calling thread’s ID

SYNOPSIS

POSIX cc [ flag ... ] file ... − lpthread [ library ... ]

#include <pthread.h> pthread_t pthread_self(void);

typedef unsigned int pthread_t;

Solaris cc [ flag ... ] file ... − lthread [ library ... ]

#include <thread.h> thread_t thr_self(void) typedef unsigned int thread_t;

MT-LEVEL MT-Safe

DESCRIPTION thr_self( ) returns the thread ID of the calling thread.

pthread_self( ) performs the same function as thr_self( ).

SEE ALSO pthread_create (3T), pthread_equal (3T) modified 30 Jun 1995 3T-867