ucontext (5) Headers, Tables, and Macros SunOS 5.5

NAME ucontext − user context

SYNOPSIS #include <ucontext.h>

DESCRIPTION The ucontext structure defines the context of a thread of control within an executing process.

This structure includes at least the following members:

ucontext_t uc_link sigset_t uc_sigmask stack_t uc_stack mcontext_t uc_mcontext uc_link is a pointer to the context that to be resumed when this context returns. If uc_link is equal to 0, then this context is the main context, and the process exits when this context returns.

uc_sigmask defines the set of signals that are blocked when this context is active [see sigprocmask (2)].

uc_stack defines the stack used by this context [see sigaltstack (2)].

uc_mcontext contains the saved set of machine registers and any implementation specific context data. Portable applications should not modify or access uc_mcontext .

SEE ALSO getcontext (2), sigaction (2), sigaltstack (2), sigprocmask (2), makecontext (3C)

5-140 modified 3 Jul 1990