SunOS 5.5 Devices cgthree (7D )

NAME cgthree − 8-bit color memory frame buffer

SYNOPSIS /dev/fbs/cgthree n

DESCRIPTION cgthree is a color memory frame buffer. It provides the standard frame buffer interface as defined in fbio (7I).

FILES /dev/fbs/cgthree[0-9]

SEE ALSO mmap (2), fbio (7I) modified 27 Mar 1992 7D-65