kstat (7D ) Devices SunOS 5.5

NAME kstat − kernel statistics driver

DESCRIPTION The kstat driver is the mechanism used by the kstat (3K) library to extract kernel statistics. This is NOT a public interface.

FILES /dev/kstat kernel statistics driver

SEE ALSO kstat (3K), kstat (9S)

7D-180 modified 26 May 1994