Solaris PEXlib Reference Manual PEXCopyBytesToOC (3)

NAME PEXCopyBytesToOC − Copy Encoded Output Commands

SYNTAX void PEXCopyBytesToOC (Display ∗display, int length, char ∗data)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

length The number of bytes to copy.

data A pointer to the output command data.

RETURNS None

DESCRIPTION This function copies the specified number of bytes of data to the transport buffer.

It is recommended that the number of bytes be a multiple of four as the protocol format requires output commands to be aligned on four-byte boundaries. It is the application’s responsibility to ensure that alignment restrictions are met.

PEXStartOCs (3) must be called prior to this.

ERRORS None

SEE ALSO PEXStartOCs (3)

PEXFinishOCs (3)

PEXGetOCAddr (3) modified November 1995 33