PEXCopyLookupTable (3) Solaris PEXlib Reference Manual

NAME PEXCopyLookupTable − Copy Lookup Table

SYNTAX void PEXCopyLookupTable (Display ∗display, PEXLookupTable src_table, PEX-

LookupTable dst_table)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

src_table The resource identifier of the source lookup table.

dst_table The resource identifier of the destination lookup table.

RETURNS None

DESCRIPTION This function copies entries from the source lookup table to destination lookup table, after first deleting all entries in the destination lookup table. Both tables must already exist as valid lookup table resources. Both must have been created for the same class of drawables, and both must be the same table type.

DATA

STRUCTURES typedef XID PEXLookupTable;

ERRORS BadMatch

The specified lookup tables were not created with compatible drawables.

BadPEXLookupTable

A specified lookup table resource identifier is invalid, or the table type is unsupported.

SEE ALSO PEXCreateLookupTable(3)

36 modified November 1995