Solaris PEXlib Reference Manual PEXCountOCs (3)

NAME PEXCountOCs − Count Output Commands in an Encoded List

SYNTAX unsigned long PEXCountOCs (int float_format, unsigned long length, char ∗encoded_ocs)

PARAMETERS float_format The floating point format of the encoded output commands ( PEX-

IEEE_754_32, PEXDEC_F_Floating, PEXIEEE_754_64,

PEXDEC_D_Floating ).

length The length, in bytes, of the encoded output commands.

encoded_ocs A pointer to the encoded output commands.

RETURNS The number of output commands represented in the encoded output commands.

DESCRIPTION This function has no visible effect. This function returns the number of output commands in the encoded list of output commands.

A count of zero will be returned if the specified floating point format is not supported.

ERRORS None

SEE ALSO PEXDecodeOCs (3) modified November 1995 41