Solaris PEXlib Reference Manual PEXCreatePickMeasure (3)

NAME PEXCreatePickMeasure − Create Pick Measure

SYNTAX PEXPickMeasure PEXCreatePickMeasure (Display ∗display, PEXWorkstation workstation, int pick_device_type)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

workstation The resource identifier of the workstation.

pick_device_type

The pick device type ( PEXPickDeviceDCHitBox or PEXPickDeviceNP-

CHitVolume ).

RETURNS The resource identifier of the newly-created pick measure.

DESCRIPTION This function creates a pick measure resource of the type specified. The pick measure is initialized with the values contained in the appropriate pick device descriptor stored in the specified workstation. The supported pick device types are inquirable via PEX-

GetEnumTypeInfo (3).

DATA

STRUCTURES typedef XID PEXWorkstation;

typedef XID PEXPickMeasure;

ERRORS BadAlloc

The server failed to allocate the resource.

BadPEXWorkstation

The specified workstation resource identifier is invalid.

BadValue

The specified pick device type is invalid.

SEE ALSO PEXFreePickMeasure (3)

PEXGetEnumTypeInfo (3) modified November 1995 45