PEXEncodeOCs (3) Solaris PEXlib Reference Manual

NAME PEXEncodeOCs − Encode Output Commands

SYNTAX char ∗PEXEncodeOCs (int float_format, unsigned long oc_count, PEXOCData ∗oc_data, unsigned long ∗length_return)

PARAMETERS float_format The floating point format of the encoded output commands ( PEX-

IEEE_754_32, PEXDEC_F_Floating, PEXIEEE_754_64,

PEXDEC_D_Floating ).

oc_count The number of output commands to be encoded.

oc_data An array of the output command data.

length_return Returns the length, in bytes, of the encoded output commands.

RETURNS A pointer to the encoded output commands; a null pointer if unsuccessful or if zero output commands specified.

DESCRIPTION This function has no visible effect. The data typically passed as parameters to output attribute or primitive functions is passed in and encoded into protocol formatted output commands. The encoded data is returned in memory allocated by PEXlib. PEXFreeOC-

Data (3) should be called to deallocate the memory.

A null pointer will be returned if the specified floating point format is not supported.

Any text or annotation text primitives must be specified as encoded text or encoded annotation text.

ERRORS None

SEE ALSO PEXDecodeOCs (3)

64 modified November 1995