Solaris PEXlib Reference Manual PEXFreeEnumInfo (3)

NAME PEXFreeEnumInfo − Free Memory Allocated for Enumerated Type Information

SYNTAX void PEXFreeEnumInfo (unsigned long count, unsigned long ∗info_count, PEXEnum-

TypeDesc ∗enum_info)

PARAMETERS count The number of enumerated types.

info_count An array of counts. This corresponds to the info_count_return parameter in PEXGetEnumTypeInfo (3).

enum_info An array of enumerated type descriptors. This corresponds to the enum_info_return parameter of PEXGetEnumTypeInfo (3).

RETURNS None

DESCRIPTION PEXFreeEnumInfo frees memory allocated by PEXlib for the return value and return parameter in PEXGetEnumTypeInfo (3).

ERRORS None

SEE ALSO PEXGetEnumTypeInfo (3) modified November 1995 119