PEXFreeTableEntries (3) Solaris PEXlib Reference Manual

NAME PEXFreeTableEntries − Free Storage associated with Tables Entries Return Parameters

SYNTAX void PEXFreeTableEntries (int table_type, unsigned int count, PEXPointer entries)

PARAMETERS table_type The type of table entries in the array.

count The number of entries in the array.

entries An array of table entries.

RETURNS None

DESCRIPTION This function deallocates memory returned by PEXGetPredefinedEntries (3), PEXGetTableEntries (3) and PEXGetTableEntry (3).

ERRORS None

SEE ALSO PEXGetPredefinedEntries (3)

PEXGetTableEntries (3)

PEXGetTableEntry (3)

136 modified November 1995