Solaris PEXlib Reference Manual PEXGSE(3)

NAME PEXGSE - Generalized Structure Element

SYNTAX void PEXGSE(Display ∗display, XID resource_id, PEXOCRequestType req_type, long id, int length, char ∗data)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

resource_id The resource identifier of the renderer or structure.

req_type The request type for the output command ( PEXOCRender, PEXOC-

Store, PEXOCRenderSingle or PEXOCStoreSingle ).

id The identifier of the GSE.

length The length, in bytes, of the GSE data.

data A pointer to the GSE data.

RETURNS None

DESCRIPTION This function creates a generalized structure element.

The complete interface and behavior for each GSE identifier should be available with the individual PEX server implementations. If the specified GSE identifier is not supported, then the output command is ignored. The table below lists the supported GSE identifiers.

GSE Identifier Description

PEXSunGSEIdSetHighlightColor Set highlighting color

PEXSunGSEIdSetTextSlantAngle Set text slant angle

PEXSunGSEIdSetAnnotTextSlantAngle Set annotation text slant angle

PEXSunGSEIdSetStrokeAAliasParams Set stroke anti-aliasing parameters

PEXSunGSEIdSetEndcap Set stroke end cap

PEXSunGSEIdSetStrokeJoin Set stroke join

PEXSunGSEIdSetSilhouetteEdgeFlag Set silhouette edge flag

PEXSunGSEIdSetSurfTranspCoef Set surface transparency coefficient

ESGseSphereRadius Set sphere radius

ESGseSphereDivisions Set sphere precision

ESGseCylinderRadius Set cylinder radius

ESGseCylinderDivisions Set cylinder precision

PEXGSE(3) Solaris PEXlib Reference Manual

ERRORS BadPEXRenderer

The specified renderer resource identifier is invalid.

BadPEXStructure

The specified structure resource identifier is invalid.