Solaris PEXlib Reference Manual PEXGetElementInfo (3)

NAME PEXGetElementInfo - Get Element Information

SYNTAX Status PEXGetElementInfo (Display ∗display, PEXStructure structure, int whence1, long offset1, int whence2, long offset2, int float_format, unsigned long ∗count_return,

PEXElementInfo ∗∗info_return)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

structure The resource identifier of the structure.

whence1 A value specifying, with offset1, the first limit of the range of queried elements ( PEXBeginning, PEXCurrent, PEXEnd ).

offset1 The offset from whence1 denoting the first limit of the range of queried elements.

whence2 A value specifying, with offset2, the second limit of the range of elements to be queried ( PEXBeginning, PEXCurrent, PEXEnd ).

offset2 The offset from whence2 denoting the second limit of the range of elements to be queried.

float_format The floating point format to use when computing element sizes ( PEX-

IEEE_754_32, PEXDEC_F_Floating, PEXIEEE_754_64,

PEXDEC_D_Floating ).

count_return Returns the number element info records returned.

info_return Returns an array of element info records describing the elements in the specified range.

RETURNS Zero if unsuccessful, non-zero otherwise.

DESCRIPTION This function returns information about a range of elements from the specified structure.

If a computed offset is less than zero it is set to zero before obtaining the element information. If a computed offset is greater than the number of elements in the structure, it is set to the offset of the last structure element in the structure. The element pointer attribute of structure is not affected by this command.

Information returned about the list of inquired elements includes the type of each element and its size. The size of each element is based upon the specified floating point format. No information is returned for inquires on element offset zero. The element pointer is not affected by this function.

PEXlib allocates memory for the return value. XFree should be called to deallocate the memory.

PEXGetElementInfo (3) Solaris PEXlib Reference Manual

DATA

STRUCTURES typedef XID PEXStructure;

typedef struct { unsigned short type;

unsigned short length;

}PEXElementInfo;

ERRORS BadPEXFloatingPointFormat

The specified floating point format is invalid or unsupported.

BadPEXStructure

The specified structure resource identifier is invalid.

BadValue

The specified value for whenceparameter is invalid.

SEE ALSO PEXCreateStructure (3)