PEXGetOCAddr (3) Solaris PEXlib Reference Manual

NAME PEXGetOCAddr - Get Address For Encoded Output Commands

SYNTAX char ∗PEXGetOCAddr (Display ∗display, int length)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

length The number of bytes of data to be written by the application.

RETURNS A pointer to memory where the application can write output command data; a null pointer if unsuccessful.

DESCRIPTION This function returns a memory address to the specified number of bytes in the transport buffer where the application can write data.

The pointer returned is valid only until the next PEXGetOCAddr or PEXCopyBytes-

ToOC (3) is called.

An attempt to request more bytes than remaining in the transport buffer, or more bytes than returned by PEXGetOCAddrMaxSize (3), will result in an unsuccessful return value.

PEXStartOCs (3) must be called prior to this.

DO NOTattempt to deallocate or free memory at the address returned by this function.

ERRORS None

SEE ALSO PEXStartOCs (3)

PEXFinishOCs (3)

PEXCopyBytesToOC (3)

PEXGetOCAddrMaxSize (3)

182 modified November 1995