Solaris PEXlib Reference Manual PEXGetOCAddrMaxSize (3)

NAME PEXGetOCAddrMaxSize - Macro to Obtain the Maximum Size for PEXGetOCAddr

SYNTAX PEXGetOCAddrMaxSize (display)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

DESCRIPTION This macro evaluates to the maximum size for the length parameter of PEXGetO-

CAddr (3).

ERRORS None

SEE ALSO PEXGetOCAddr (3) modified November 1995 183