Solaris PEXlib Reference Manual PEXGetPickMeasure (3)

NAME PEXGetPickMeasure - Get Pick Measure Attributes

SYNTAX PEXPMAttributes ∗PEXGetPickMeasure (Display ∗display, PEXPickMeasure pick_measure, unsigned long value_mask)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

pick_measure The resource identifier of the pick measure.

value_mask A mask indicating which attributes to return.

RETURNS A pointer to the pick measure attribute values; a null pointer if unsuccessful.

DESCRIPTION This function returns the specified pick measure attribute values. The value mask indicates which attributes are to be returned. The value mask is constructed by OR’ing together the following constants:

PEXPMStatus

PEXPMPath

PEXlib allocates memory for the return value. PEXFreePMAttributes (3) should be called to deallocate the memory.

DATA

STRUCTURES typedef XID PEXPickMeasure;

typedef struct { unsigned short status;

PEXPickPath pick_path;

}PEXPMAttributes;

typedef struct { unsigned long count; / ∗ number of elements ∗/

PEXPickElementRef ∗elements;

}PEXPickPath;

typedef struct {

PEXStructure sid;

unsigned long offset;

unsigned long pick_id;

}PEXPickElementRef;

typedef XID PEXStructure;

ERRORS BadPEXPickMeasure

The specified pick_measureresource identifier is invalid.

BadValue

An invalid bit is set in the value mask.

PEXGetPickMeasure (3) Solaris PEXlib Reference Manual

SEE ALSO PEXCreatePickMeasure (3)