Solaris PEXlib Reference Manual PEXGetSizeOCs (3)

NAME PEXGetSizeOCs - Return the Protocol Formatted Size of Output Commands

SYNTAX int PEXGetSizeOCs (int float_format, int oc_count, PEXOCData ∗oc_data)

PARAMETERS float_format The floating point format to use in computing the formatted size.

oc_count The number of output commands.

oc_data An array of output command data.

RETURNS The size, in bytes, of the formatted output commands; zero if unsuccessful.

DESCRIPTION This function returns information about the size of the protocol for the output commands. An unsuccessful return value is possible if the specified floating point format is invalid or unsupported by PEXlib.

DATA

STRUCTURES See PEXlib.h for the definition of PEXOCData.

ERRORS None modified November 1995 199