PEXGetStructuresInNetwork (3) Solaris PEXlib Reference Manual

NAME PEXGetStructuresInNetwork - Get Structures in Network

SYNTAX PEXStructure ∗PEXGetStructuresInNetwork (Display ∗display, PEXStructure structure, int which, unsigned long ∗count_return)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

structure The resource identifier of the root structure in the structure network.

which A value indicating which structure resource identifiers to return ( PEX-

All or PEXOrphans ).

count_return Returns the number of structure resource identifiers returned.

RETURNS An array of structure resource identifiers; a null pointer if unsuccessful.

DESCRIPTION This function returns a list of unique structure resource identifiers that are referenced in the structure network rooted at the specified structure. PEXAll indicates that identifiers of all structure resources referenced in the structure network are returned. PEXOrphans indicates that identifiers returned are those not referenced by any structures outside of those in the specified structure network.

The specified structure identifier will always be returned in the list, unless it is an invalid structure identifier, in which case the returned list will be empty.

PEXlib allocates memory for the return value. XFree should be called to deallocate the memory.

DATA

STRUCTURES typedef XID PEXStructure;

ERRORS BadPEXStructure

The specified structure resource identifier is invalid.

BadValue

The specified value for which parameter is invalid.

SEE ALSO PEXCreateStructure (3)

PEXGetAncestors (3)

PEXGetDescendants (3)

202 modified November 1995