Solaris PEXlib Reference Manual PEXGetTableInfo (3)

NAME PEXGetTableInfo - Get Lookup Table Information

SYNTAX Status PEXGetTableInfo (Display ∗display, Drawable drawable, int table_type, PEXTableInfo ∗info_return)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

drawable The resource identifier of a drawable.

table_type The type of lookup table (see the Description).

info_return Returns the lookup table information.

RETURNS Zero if unsuccessful, non-zero otherwise.

DESCRIPTION This function returns information about the specified type of lookup table. The type of lookup table must be one of the following:

PEXLUTColor

PEXLUTColorApprox

PEXLUTDepthCue

PEXLUTEdgeBundle

PEXLUTInteriorBundle

PEXLUTLight

PEXLUTLineBundle

PEXLUTMarkerBundle

PEXLUTPattern

PEXLUTTextBundle

PEXLUTTextFont

PEXLUTView

The returned information is based on the assumption that the lookup table would be used on drawables with the same root and depth as the specified drawable. The returned information includes the number of predefined table entries, the number of definable table entries, and the indices of the predefined minimum and maximum entries.

Predefined entries are contiguous. The number of definable table entries includes the number of predefined entries since predefined table entries can be redefined by the application. All entries between the predefined minimum and maximum values are guaranteed to be defined initially (i.e. predefined entries have contiguous indices).

DATA

STRUCTURES typedef struct { unsigned short definable_entries;

unsigned short predefined_count;

unsigned short predefined_min;

unsigned short predefined_max;

}PEXTableInfo;

PEXGetTableInfo (3) Solaris PEXlib Reference Manual

ERRORS BadDrawable

The specified drawable resource identifier is invalid.

BadMatch

The specified drawable is unsupported.

BadPEXLookupTable

The specified table type is unsupported.

BadValue

The specified table type is invalid.

SEE ALSO PEXCreateLookupTable(3)