Solaris PEXlib Reference Manual PEXGetWorkstationViewRep (3)

NAME PEXGetWorkstationViewRep - Get Workstation View Representation

SYNTAX Status PEXGetWorkstationViewRep (Display ∗display, PEXWorkstation workstation, unsigned int index, int ∗update_return , PEXViewRep ∗req_view_return, PEX-

ViewRep ∗cur_view_return)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

workstation The resource identifier of the workstation.

index The view table index.

update_return Returns the update status of the view table index.

req_view_return Returns the requested value of the view table index.

cur_view_return Returns the current value of the view table index.

RETURNS Zero if unsuccessful, non-zero otherwise.

DESCRIPTION The function returns the update state, and the requested and current values for the specified view index of the specified workstation. The update will be PEXPending if a view change has been requested but not established; otherwise it will be PEXNotPending

. If the specified view index is not defined, an error will be generated and the contents of the reply parameters will be undefined.

DATA

STRUCTURES typedef XID PEXWorkstation;

typedef struct {

PEXTableIndex index;

unsigned short reserved;

PEXViewEntry view;

}PEXViewRep;

typedef unsigned short PEXTableIndex;

typedef struct { unsigned short clip_flags;

unsigned short reserved;

PEXNPCSubVolume clip_limits;

PEXMatrix orientation;

PEXMatrix mapping;

}PEXViewEntry;

typedef struct {

PEXCoord min;

PEXCoord max;

}PEXNPCSubVolume;

PEXGetWorkstationViewRep (3) Solaris PEXlib Reference Manual typedef struct { float x;

float y;

float z;

}PEXCoord;

typedef float PEXMatrix[4][4];

ERRORS BadPEXWorkstation

The specified workstation resource identifier is invalid.

BadValue

The specified view table entry is not defined.

SEE ALSO PEXSetWorkstationViewRep (3)