Solaris PEXlib Reference Manual PEXInitialize (3)

NAME PEXInitialize - Initialize PEXlib display connection

SYNTAX int PEXInitialize (Display ∗display, PEXExtensionInfo ∗∗info_return, int length, char

∗error_string )

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

info_return Returns a pointer to the extension information; if available (see the

Description).

length The length, in bytes, of the memory allocated for the error string.

error_string A pointer to memory allocated for the error string.

RETURNS Zero if successful; otherwise, one of the following return values:

PEXBadExtension

PEXBadProtocolVersion

PEXBadFloatConversion

PEXBadLocalAlloc

DESCRIPTION PEXInitialize initializes PEXlib for the specified display.

PEXInitialize can be called multiple times; subsequent calls will result in the same return value as the first call.

Standard PEXInitialize failure return values are:

PEXBadExtension - the PEX server extension does not exist,

PEXBadProtocolVersion - the PEX server extension does not support a compatible protocol version,

PEXBadFloatConversion - the PEX server extension does not support a protocol floating point format compatible with PEXlib’s native format or a format to which PEXlib supports conversion, or

PEXBadLocalAlloc - PEXlib client-side allocation failed.

If PEXInitialize is successful (return value is zero), or if the return value is PEXBadProtocolVersion, a pointer to the extension information is returned in info_return. Otherwise, a

NULL pointer is returned in info_return. Theextension information is private to PEXlib and must not be modified or freed by the application.

The error string parameter specifies an address to memory allocated by the application.

The constant PEXErrorStringLength is defined as a guideline for the size to allocate for the error string. If no failure occurred, the memory addressed by the error string parameter will be unchanged. If a failure does occur, an error string giving further information about the failure will be copied into this memory (up to the maximum specified by the length parameter).

PEXInitialize (3) Solaris PEXlib Reference Manual

The actual string returned is implementation dependent, and is provided primarily for convenience in printing an error message for the application’s end-user.

DATA

STRUCTURES typedef struct { unsigned short major_version;

unsigned short minor_version;

unsigned long release;

unsigned long subset_info;

char ∗vendor_name;

int major_opcode;

int first_event;

int first_error;

}PEXExtensionInfo;

ERRORS None

SEE ALSO PEXGetExtensionInfo (3)

PEXGetEnumTypeInfo (3)

PEXGetImpDepConstants (3)

PEXMatchRenderingTargets (3)