PEXInvertMatrix2D (3) Solaris PEXlib Reference Manual

NAME PEXInvertMatrix2D - utility function

SYNTAX int PEXInvertMatrix2D (PEXMatrix3x3 transform, PEXMatrix3x3 transform_return )

PARAMETERS transform The transformation matrix to invert.

transform_return

The inverse transformation.

RETURNS Zero if successful; non-zero if unsuccessful.

DESCRIPTION This function computes the inverse of a 2D transformation matrix.

An unsuccessful status is returned if the matrix is non-invertible.

The two arguments may be the same variable, in which case the inversion is performed in-place, overwriting the original transform.

ERRORS None

SEE ALSO PEXInvertMatrix (3)

222 modified November 1995