Solaris PEXlib Reference Manual PEXLoadFont (3)

NAME PEXLoadFont - Load PEX Font

SYNTAX PEXFont PEXLoadFont (Display ∗display, char ∗font_name)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

font_name The font name (null-terminated string).

RETURNS The resource identifier of the loaded PEX font.

DESCRIPTION This function loads the specified PEX font, if necessary. The font name should use the

ISO Latin-1 encoding and case is not significant in matching names. PEX fonts are not associated with a particular screen, and can be used with any renderer or PHIGS workstation resource. An error will be generated if the specified font is not "PEX usable", that is, it is not capable of supporting the full range of PEX text attributes.

DATA

STRUCTURES typedef XID PEXFont;

ERRORS BadAlloc

The server failed to allocate the resource.

BadPEXFont

The specified font name does not name a usable PEX font.

SEE ALSO PEXUnloadFont (3) modified November 1995 227